\section{EXAMPLES}

The following examples of input files represent a typical core modeling
using DONJON. The main characteristics of a simplified design for the
ACR-700 benchmark core model are given below.

\vskip 1.2cm
\begin{figure}[h!]
  \begin{center}
    \includegraphics[scale=0.12]{Figures/FaceView.eps} 
\caption{Face View of ACR Benchmark Core Model (292 Channels)}\label{fig:face}
  \end{center}
\end{figure}

\begin{itemize}

\item Number of reactor channels 292
\item Number of fuel bundles per channel 12
\item Core radius 260 cm
\item Core length 594.36 cm
\item Lattice pitch 22 cm
\item Reactor thermal power 1800 MW(th)

\end{itemize}

\goodbreak
\subsection{\tst(Example1) -- Compo related example}
\listing{Example1.x2m}

\goodbreak
\subsection{\tst(Example2) -- Multicompo related example}
\listing{Example2.x2m}

\goodbreak
\subsection{Procedures}
\subsubsection{Input file for geometry}
\vskip 0.5cm
\begin{figure}[h!]
  \begin{center}
    \includegraphics[scale=0.15]{Figures/Geom.eps} 
\caption{Geometry definition (plane-1)}\label{fig:geom}
  \end{center}
\end{figure}

\listing{Pgeom.c2m}

\goodbreak
\subsubsection{Input file for devices}

\begin{figure}[h!]
  \begin{center}
    \includegraphics[scale=0.3]{Figures/TopView.eps} 
\caption{Top View of ACR Benchmark Core Model}\label{fig:top}
  \end{center}
\end{figure}

\listing{Pdevc.c2m}

\goodbreak
\subsubsection{Input file for fuel map}
\listing{Pfmap.c2m}

\goodbreak
\subsubsection{Input file for exit burnups}
\vskip 0.5cm
\begin{figure}[h!]
  \begin{center}
    \includegraphics[scale=0.15]{Figures/CombBurn.eps} 
\caption{Combustion zones definition}\label{fig:comb}
  \end{center}
\end{figure}

\listing{Pburn.c2m}
\clearpage
