\subsection{The {\tt APX:} module}\label{sect:APEXData}

This component of the lattice code is dedicated to the constitution of the
reactor database in APEX format, similar to the file produced by APOLLO2-A.\cite{Apollo2}
The APEX file intended to store {\sl all} the nuclear data, produced in
the lattice code, that is useful
in reactor calculations including fuel management and space-time kinetics.
Multigroup lattice calculations are too expensive to be executed dynamically
from the driver of the global reactor calculation. A more feasible
approach is to create a reactor database where a finite number of lattice
calculation results are tabulated against selected {\sl global parameters}
chosen so as to represent expected operating conditions of the reactor. The
\moc{APX:} operator is used to create and construct a {\sc APEX} file.
The APEX file is written in {\sc hdf5} format, allowing full portability and hierarchical
data organization. It can be edited and modified using the HDFView tool.

\vskip 0.1cm

Each elementary calculation is characterized by a tuple of {\sl global parameters}.
These global parameters are of different types, depending on the nature of the
study under consideration: type of assembly, power, temperature in a mixture,
concentration of an isotope, time, burnup or exposure rate in a depletion calculation,
etc. Each step of a depletion calculation represents an elementary calculation.
The {\sc APEX} file is often presented as a {\sl multi-parameter reactor database}.

\vskip 0.1cm

For each elementary calculation, the results are recovered from the output of the
\moc{EDI:} operator and stored in a set of {\sl homogenized mixture}
directories. The \moc{EDI:} operator is responsible for performing condensation
in energy and homogenization in space of the macroscopic and microscopic cross
sections. All the elementary calculations gathered in a single {\sc apex} file are
characterized by a single output geometry and a unique output energy-group
structure.

\vskip 0.1cm

In each homogenized mixture directory, the \moc{APX:} operator recover
cross sections for a number of {\sl particularized isotopes} and {\sl macroscopic total and/or
residual sets}, a collection of isotopic cross sections weighted by isotopic number densities.
Cross sections for particularized isotopes and macroscopic sets are recovered for
{\sl selected reactions}. Other information is also recovered: multigroup neutron
fluxes, isotopic number densities, fission spectrum and yields, SPH or discontinuity factors and
albedos. Discontinuity factors and equivalent albedos are written in group {\tt miscelleaneous}.
Finally, note that cross section information written on the {\sc apex} file is {\sl not}
transport corrected and {\sl not} SPH corrected.

\vskip 0.1cm

A different specification of the \moc{APX:} function call is used for
creation and construction of the {\sc apex} file.
\begin{itemize}
\item The first specification is used to initialize the {\sc apex} data structure
as a function of the \dds{microlib} used in the reference calculation. The initialization
call is also used to set the choice of global parameters, local variables, particularized
isotopes, macroscopic sets and selected reactions.
\item A modification call to the \moc{APX:} function is performed after each
elementary calculation in order to recover output information processed by \moc{EDI:}
(condensed and homogenized cross sections) and \moc{EVO:} (burnup dependant values).
Global parameters and local variables can optionnally be recovered from \dds{microlib}
objects. The \moc{EDI:} calculation is generally performed with option {\tt MICR ALL}.
\end{itemize}

The calling specifications are:

\vskip -0.5cm

\begin{DataStructure}{Structure \dstr{APX:}}
$\{$~~\dusa{APXNAM} \moc{:=} \moc{APX:} $[$ \dusa{APXNAM} $]~[$~\dusa{HMIC} $]$ \moc{::} \dstr{apex\_data1} \\
~~~$|$~~~\dusa{APXNAM} \moc{:=} \moc{APX:} \dusa{APXNAM}~\dusa{EDINAM}~$[$ \dusa{BRNNAM} $]$ \moc{::} \dstr{apex\_data2} \\
~~~$|$~~~\dusa{APXNAM} \moc{:=} \moc{APX:} \dusa{APXNAM} $[[$ \dusa{APXRHS} $]]$ \moc{::} \dstr{apex\_data3} $\}$ \\
\end{DataStructure}

\noindent where
\begin{ListeDeDescription}{mmmmmmm}

\item[\dusa{APXNAM}] {\tt character*12} name of the {\sc lcm} object containing the
{\sl master} {\sc apex} data structure.

\item[\dusa{HMIC}] {\tt character*12} name of the reference \dds{microlib} (type {\tt
L\_LIBRARY}) containing the microscopic cross sections. Isotope names are recovered
from \dusa{HMIC}.

\item[\dusa{EDINAM}] {\tt character*12} name of the {\sc lcm} object (type {\tt
L\_EDIT}) containing the {\sc edition} data structure corresponding to an elementary
calculation. The {\sc edition} data produced by the last call to the {\tt EDI:} module
is used.

\item[\dusa{BRNNAM}] {\tt character*12} name of the {\sc lcm} object (type {\tt
L\_BURNUP}) containing the {\sc burnup} data structure. This object is compulsory if one
of the following parameters is used: \moc{IRRA}, \moc{FLUB} and/or \moc{TIME}.

\item[\dusa{APXRHS}] {\tt character*12} name of the {\sl read-only} {\sc apex} file. This
data structure is concatenated to \dusa{APXNAM} using the \dusa{apex\_data3} data structure,
as presented in \Sect{descsapx3}. \dusa{APXRHS} must be defined with the same number of energy
groups and the same number of homogeneous regions as \dusa{APXNAM}. Moreover, all the
global and local parameters of \dusa{APXRHS} must be defined in \dusa{APXNAM}. \dusa{APXNAM}
may be defined with {\sl global} parameters not defined in \dusa{APXRHS}.

\item[\dusa{apex\_data1}] input data structure containing initialization information (see \Sect{descsapx1}).

\item[\dusa{apex\_data2}] input data structure containing information related to the recovery of an
elementary calculation (see \Sect{descsapx2}).

\item[\dusa{apex\_data3}] input data structure containing information related to the catenation of one or many
{\sl read-only} {\sc apex} (see \Sect{descsapx3}).

\end{ListeDeDescription}

\subsubsection{Initialization data input for module {\tt APX:}}\label{sect:descsapx1}

\vskip -0.8cm

\begin{DataStructure}{Structure \dstr{apex\_data1}}
$[$~\moc{EDIT} \dusa{iprint}~$]$ \\
$[$~\moc{NOML}~\dusa{nomlib}~$]$ \\
$[[$~\moc{PARA}~\dusa{parnam}~\dusa{parkey}~\{~\moc{BURN}~$|$~\moc{VALE}~\{~\moc{FLOT}~$|$~\moc{CHAI}~$|$~\moc{ENTI}~\}~\} $]]$ \\
$[$~\moc{ISOT}~\{~\moc{TOUT}~$|$ \moc{MILI}~\dusa{imil}~$|~[$~\moc{FISS}~$]~[$~\moc{PF}~$]~[$~(\dusa{HNAISO}(i),~i=1,$N_{\rm iso}$) $]$~\}~$]$ \\
$[[$~\moc{MACR}~\{~\moc{TOUT}~$|$~\moc{REST}~\}~$]]$ \\
$[$~\moc{REAC}~(\dusa{HNAREA}(i),~i=1,$N_{\rm reac}$) $]$ \\
{\tt ;}
\end{DataStructure}

\goodbreak
\noindent where
\begin{ListeDeDescription}{mmmmmmmm}

\item[\moc{EDIT}] key word used to set \dusa{iprint}.

\item[\dusa{iprint}] index used to control the printing in module {\tt
APX:}. =0 for no print; =1 for minimum printing (default value).

\item[\moc{NOML}] key word used to input a user--defined name for the {\sc apex} file.

\item[\dusa{nomlib}] {\tt character*80} user-defined name.

\item[\moc{PARA}] keyword used to define a single global parameter.

\item[\dusa{parnam}] {\tt character*80} user-defined name of a global parameter. The
following names are recommended:

\begin{center}
\begin{tabular}{| l | l | l |}
\hline
\dusa{parnam} & type & recovered from \\
\hline
Burnup & fuel burnup (MW-d/tonne) & \dusa{BRNNAM} \\
Time & time (s) & \dusa{BRNNAM} \\
Power & reactor power (MeV/s) & \dusa{BRNNAM} \\
Exposure & flux exposure (n/Kb) & \dusa{BRNNAM} \\
Flux & neutron flux (n/cm$^2$/s) & \dusa{BRNNAM} \\
Heavy & heavy mass in fuel (g) & \dusa{BRNNAM} \\
ModeratorDensity & moderator density (g/cc) & {\tt VALE FLOT} \\
CoolantDensity & coolant density (g/cc) & {\tt VALE FLOT} \\
BoronPPM & Boron concentration (ppm) & {\tt VALE FLOT} \\
ModeratorTemperature & moderator temperature (K) & {\tt VALE FLOT} \\
CoolantTemperature & coolant temperature (K) & {\tt VALE FLOT} \\
FuelTemperature & fuel temperature (K) & {\tt VALE FLOT} \\
ModeratorVoid & void fraction in coolant & {\tt VALE FLOT} \\
\hline
\end{tabular}
\end{center}

\item[\moc{BURN}] keyword used to recover the local parameter value from input object \dusa{BRNNAM}.
This keyword cal be used if \dusa{parnam} $=$ \moc{Burnup}, \moc{Time}, \moc{Power}, \moc{Exposure}, \moc{Flux} or \moc{Heavy}.

\item[\moc{VALE}] keyword used to define a user-defined quantity as global parameter.
This keyword must be followed by the type of parameter.

\item[\moc{FLOT}] keyword used to indicate that the user-defined global parameter
is a floating point value.

\item[\moc{CHAI}] keyword used to indicate that the user-defined global parameter
is a {\tt character*12} value.

\item[\moc{ENTI}] keyword used to indicate that the user-defined global parameter
is an integer value.

\item[\moc{ISOT}] keyword used to select the set of particularized isotopes.

\item[\moc{TOUT}] keyword used to select all the available isotopes in the reference
\dds{microlib} named \dusa{HMIC} as particularized isotopes.

\item[\moc{MILI}] keyword used to select the isotopes in the reference
\dds{microlib} named \dusa{HMIC} from a specific mixture as particularized isotopes.

\item[\dusa{imil}] index of the mixture where the particularized isotopes are recovered.

\item[\moc{FISS}] keyword used to select all the available fissile isotopes in the reference
\dds{microlib} named \dusa{HMIC} as particularized isotopes.

\item[\moc{PF}] keyword used to select all the available fission products in the reference
\dds{microlib} named \dusa{HMIC} as particularized isotopes.

\item[\dusa{HNAISO}(i)] {\tt character*12} user-defined isotope name. $N_{\rm iso}$ is the
total number of explicitely--selected particularized isotopes.

\item[\moc{MACR}] keyword used to select a type of macroscopic set. A maximum of two macroscopic sets is allowed.

\item[\moc{TOUT}] keyword used to select all the available isotopes in the macroscopic set.

\item[\moc{REST}] keyword used to remove all the particularized isotope contributions
from the macroscopic set.

\item[\moc{REAC}] keyword used to select the set of nuclear reactions.

\item[\dusa{HNAREA}(i)] {\tt character*4} name of a user-selected reaction. $N_{\rm reac}$
is the total number of selected reactions. \dusa{HNAREA}(i) is chosen among the following values:

\begin{center}
\begin{tabular}{| l | l |}
\hline
\dusa{HNAREA} & type \\
\hline
\moc{TOTA} & Total cross sections \\
\moc{TOP1} & Total $P_1$-weighted cross sections \\
\moc{ABSO} & Absorption cross sections. Note: \moc{ABSO}$=$\moc{TOTA}$-$\moc{DIFF}$_{\ell=0}$ \\
\moc{N2N} & (n,2n) reactions \\
\moc{N3N} & (n,3n) reactions \\
\moc{FISS} & Fission cross section \\
\moc{CHI}  & Steady-state fission spectrum \\
\moc{NUFI} & $\nu\Sigma_{\rm f}$ cross sections \\
\moc{KAFI} & $\kappa\Sigma_{\rm f}$ cross sections \\
\moc{LEAK} & $B^2$ times the leakage coefficient \\
\moc{DIFF} & Scattering cross section for each available Legendre order.\\
& These cross sections {\sl not} multiply by the $2\ell+1$ factor.\\
\moc{SCAT} & Transfer cross section matrices for each available Legendre order.\\
& These cross sections are multiply by the $2\ell+1$ factor.\\
\moc{CORR} & Transport correction. Note that the cross sections stored in the \\
& {\sc apex} are {\sl not} transport corrected.\\
\moc{STRD} & STRD cross sections used to compute the diffusion coefficients \\
\moc{NP}   & (n,p) production cross sections \\
\moc{NT}   & (n,t) production cross sections \\
\moc{NA}   & (n,$\alpha$) production cross sections \\
\hline
\end{tabular}
\end{center}

\end{ListeDeDescription}

\subsubsection{Modification data input for module {\tt APX:}}\label{sect:descsapx2}

\vskip -0.8cm

\begin{DataStructure}{Structure \dstr{apex\_data2}}
$[$ \moc{EDIT} \dusa{iprint} $]$ \\
$[[$ \dusa{parkey} \dusa{value} $]]$ \\
$[$ \moc{ORIG} \dusa{orig} $]$ \\
$[$ \moc{EQUI} \dusa{hequi} $]$ \\
$[$ \moc{SET} \dusa{xtr} $\{$ \moc{S} $|$ \moc{DAY} $|$ \moc{YEAR} $\}$ $]$ \\
$[$ \moc{ICAL} {\tt >>} \dusa{ical} {\tt <<} $]$ \\
{\tt ;}
\end{DataStructure}

\goodbreak
\noindent where
\begin{ListeDeDescription}{mmmmmmmm}

\item[\moc{EDIT}] key word used to set \dusa{iprint}.

\item[\dusa{iprint}] index used to control the printing in module {\tt
APX:}. =0 for no print; =1 for minimum printing (default value).

\item[\dusa{parkey}] {\tt character*4} keyword associated to a user-defined global
parameter.

\item[\dusa{value}] floating-point, integer or {\tt character*12} value of a user-defined
global parameter.

\item[\moc{ORIG}] keyword used to define the father node in the global parameter tree. By
default, the index of the previous elementary calculation is used.

\item[\dusa{orig}] index of the elementary calculation associated to the father node in the
global parameter tree.

\item[\moc{EQUI}] keyword used to define the name of a SPH equivalence factor set. By
default, \dusa{hequi}$=$ {\tt 'default'}.

\item[\dusa{hequi}] \texttt{character*80} name of a SPH equivalence factor set.

\item[\moc{SET}] keyword used to recover the flux normalization factor already
stored on \dusa{BRNNAM} from a sub-directory corresponding to a specific time.

\item[\dusa{xtr}] time associated with the current flux calculation. The
name of the sub-directory where this information is stored will be given by
`{\tt DEPL-DAT}'//{\tt CNN} where {\tt CNN} is a  {\tt character*4} variable
defined by  {\tt WRITE(CNN,'(I4)') INN} where {\tt INN} is an index associated
with the time \dusa{xtr}.

\item[\moc{S}] keyword to specify that the time is given in seconds.

\item[\moc{DAY}] keyword to specify that the time is given in days.

\item[\moc{YEAR}] keyword to specify that the time is given in years.

\item[\moc{ICAL}]  keyword used to recover the last calculation index.

\item[\dusa{ical}] \texttt{character*12} CLE-2000 variable name in which the last calculation index will be placed.

\end{ListeDeDescription}

\subsubsection{Modification (catenate) data input for module {\tt APX:}}\label{sect:descsapx3}

\vskip -0.5cm

\begin{DataStructure}{Structure \dstr{apex\_data3}}
$[$ \moc{EDIT} \dusa{iprint} $]$ \\
$[$ \moc{ORIG} \dusa{orig} $]$ \\
$[[$ \dusa{parkey} \dusa{value} $]]$ \\
$[$ \moc{WARNING-ONLY} $]$ \\
{\tt ;}
\end{DataStructure}

\noindent where
\begin{ListeDeDescription}{mmmmmmmm}

\item[\moc{EDIT}] keyword used to set \dusa{iprint}.

\item[\dusa{iprint}] index used to control the printing in module {\tt
APX:}. =0 for no print; =1 for minimum printing (default value).

\item[\dusa{parkey}] {\tt character*4} .keyword associated to a
global parameter that is specific to \dusa{APXNAM} (not defined in \dusa{APXRHS}).

\item[\dusa{value}] floating-point, integer or {\tt character*12} value of a user-defined
global parameter.

\item[\moc{ORIG}] keyword used to define the father node in the parameter tree. By
default, the index of the previous elementary calculation is used.

\item[\dusa{orig}] index of the elementary calculation associated to the father node in the
parameter tree.

\item[\moc{WARNING-ONLY}] This option is useful if an elementary calculation in \dusa{APXRHS} 
is already present in \dusa{APXNAM}. If this keyword is set, a warning is send and the \dusa{APXNAM} values
are kept, otherwise the run is aborted (default).

\end{ListeDeDescription}

\subsubsection{Specification of SPH, discontinuity factor and albedo information}\label{sect:df_apx}

SPH factors for different equivalence types are written in group {\tt MEDIA\_SPH} included in each state point of the Apex file.

\vskip -0.15cm

\begin{DescriptionEnregistrement}{Group /calc\_id/xs\_iq/MEDIA\_SPH of the Apex file}{7.5cm}
\label{tabl:tabiso202a}
\RealEnr
  {\{hequi\}}{$N_{\rm grp}$}{$1$}
  {SPH factors in zone {\tt iq}. \{hequi\} is a user-defined name corresponding to a specific type of SPH equivalence.}
\end{DescriptionEnregistrement}

\noindent where $N_{\rm grp}$ is the number of energy groups. A Dragon mixture is a zone in Apex terminology. Discontinuity factors and
equivalent albedos are written in group {\tt miscellaneous} included in each state point of the Apex file.
If the Apex file contains a unique output zone, suffix {\tt \_iq} can be omitted. Specification of some datasets are slightly modified to hold this new information:

\vskip -0.15cm

\begin{DescriptionEnregistrement}{Group /calc\_id/miscellaneous/ of the Apex file}{7.5cm}
\label{tabl:tabiso202a}
\RealEnr
  {\{hadf\}}{$N_{\rm surf}\times N_{\rm grp}$}{$1$}
  {Discontinuity factors $F^{\rm d}_{{\tt iq},b,g}$ on external surfaces $b\le N_{\rm surf}$ obtained with a nodal equivalence procedure within zone {\tt iq}.}
\OptRealEnr
  {ALBEDO}{$N_{\rm alb}\times N_{\rm grp}$}{$N_{\rm alb}\ge 1$}{1}
  {Multigroup albedos $\beta_{a,g}$ obtained with a nodal equivalence procedure.}
\end{DescriptionEnregistrement}

\vskip -0.3cm

If the Apex file contains a unique output zone, {\sl \{hadf\}} is set to ``{\tt ADF}''. Otherwise, the name of the discontinuity
factor set {\sl \{hadf\}} is composed using the following FORTRAN instruction:
  \begin{displaymath}
    \mathtt{WRITE(}\mathsf{HADF}\mathtt{,'(3HADF,I8)')} \ iq
  \end{displaymath}
\noindent where {\tt iq} $\le N_{\rm mil}$.

\clearpage
