From c234e0ad4a63b37eeb4f93ac05588403a60f2b20 Mon Sep 17 00:00:00 2001
From: Alain Hebert <alainhebert@Alains-MacBook-Pro.local>
Date: Sun, 2 Nov 2025 13:21:20 +0100
Subject: #10: Correct a power normalization issue in module EVO:

---
 doc/IGE351/SectDburnup.tex | 1 +
 1 file changed, 1 insertion(+)

(limited to 'doc/IGE351/SectDburnup.tex')

diff --git a/doc/IGE351/SectDburnup.tex b/doc/IGE351/SectDburnup.tex
index 07cb0d4..76cac21 100644
--- a/doc/IGE351/SectDburnup.tex
+++ b/doc/IGE351/SectDburnup.tex
@@ -63,6 +63,7 @@ $I_{g}=\mathcal{S}^{b}_{10}$ where
 \begin{displaymath}
 I_{g} = \left\{
 \begin{array}{rl}
+ -1 & \textrm{Compute the burnup using the fission rate in $^{235}U$ multiplied by 202.27 MeV} \\
  0 & \textrm{Compute the burnup using the power released in fuel} \\
  1 & \textrm{Compute the burnup using the power released in the global geometry} \\
 \end{array} \right.
-- 
cgit v1.2.3

