From 7dfcc480ba1e19bd3232349fc733caef94034292 Mon Sep 17 00:00:00 2001
From: stainer_t <thomas.stainer@oecd-nea.org>
Date: Mon, 8 Sep 2025 13:48:49 +0200
Subject: Initial commit from Polytechnique Montreal

---
 doc/IGE344/Exampl.tex | 74 +++++++++++++++++++++++++++++++++++++++++++++++++++
 1 file changed, 74 insertions(+)
 create mode 100644 doc/IGE344/Exampl.tex

(limited to 'doc/IGE344/Exampl.tex')

diff --git a/doc/IGE344/Exampl.tex b/doc/IGE344/Exampl.tex
new file mode 100644
index 0000000..832f30b
--- /dev/null
+++ b/doc/IGE344/Exampl.tex
@@ -0,0 +1,74 @@
+\section{EXAMPLES}
+
+The following examples of input files represent a typical core modeling
+using DONJON. The main characteristics of a simplified design for the
+ACR-700 benchmark core model are given below.
+
+\vskip 1.2cm
+\begin{figure}[h!]
+  \begin{center}
+    \includegraphics[scale=0.12]{Figures/FaceView.eps} 
+\caption{Face View of ACR Benchmark Core Model (292 Channels)}\label{fig:face}
+  \end{center}
+\end{figure}
+
+\begin{itemize}
+
+\item Number of reactor channels 292
+\item Number of fuel bundles per channel 12
+\item Core radius 260 cm
+\item Core length 594.36 cm
+\item Lattice pitch 22 cm
+\item Reactor thermal power 1800 MW(th)
+
+\end{itemize}
+
+\goodbreak
+\subsection{\tst(Example1) -- Compo related example}
+\listing{Example1.x2m}
+
+\goodbreak
+\subsection{\tst(Example2) -- Multicompo related example}
+\listing{Example2.x2m}
+
+\goodbreak
+\subsection{Procedures}
+\subsubsection{Input file for geometry}
+\vskip 0.5cm
+\begin{figure}[h!]
+  \begin{center}
+    \includegraphics[scale=0.15]{Figures/Geom.eps} 
+\caption{Geometry definition (plane-1)}\label{fig:geom}
+  \end{center}
+\end{figure}
+
+\listing{Pgeom.c2m}
+
+\goodbreak
+\subsubsection{Input file for devices}
+
+\begin{figure}[h!]
+  \begin{center}
+    \includegraphics[scale=0.3]{Figures/TopView.eps} 
+\caption{Top View of ACR Benchmark Core Model}\label{fig:top}
+  \end{center}
+\end{figure}
+
+\listing{Pdevc.c2m}
+
+\goodbreak
+\subsubsection{Input file for fuel map}
+\listing{Pfmap.c2m}
+
+\goodbreak
+\subsubsection{Input file for exit burnups}
+\vskip 0.5cm
+\begin{figure}[h!]
+  \begin{center}
+    \includegraphics[scale=0.15]{Figures/CombBurn.eps} 
+\caption{Combustion zones definition}\label{fig:comb}
+  \end{center}
+\end{figure}
+
+\listing{Pburn.c2m}
+\clearpage
-- 
cgit v1.2.3

