From 7dfcc480ba1e19bd3232349fc733caef94034292 Mon Sep 17 00:00:00 2001
From: stainer_t <thomas.stainer@oecd-nea.org>
Date: Mon, 8 Sep 2025 13:48:49 +0200
Subject: Initial commit from Polytechnique Montreal

---
 doc/IGE335/Section2.01.tex | 98 ++++++++++++++++++++++++++++++++++++++++++++++
 1 file changed, 98 insertions(+)
 create mode 100644 doc/IGE335/Section2.01.tex

(limited to 'doc/IGE335/Section2.01.tex')

diff --git a/doc/IGE335/Section2.01.tex b/doc/IGE335/Section2.01.tex
new file mode 100644
index 0000000..d726634
--- /dev/null
+++ b/doc/IGE335/Section2.01.tex
@@ -0,0 +1,98 @@
+\subsection{Data organization}\label{sect:DataOrg}
+
+The structure of the input data is independent of the physical or computational
+characteristics of the host system. The physical characteristics of the input
+data is a collection of sequential records. These characters are by necessity
+{\sc ascii} characters. The logical organization of an input deck is in the form
+of a sequential structure of input variables presented in free format. This
+structure must be located in the first 120 columns of each record in the input
+stream. Characters located in column 121 and $\le$ 132 can be used to identify the
+records and are treated as comments. An input variable can be defined in one of
+two ways.
+
+\begin{itemize}
+
+\item As a set of consecutive characters containing no blanks; it will be
+considered by DRAGON automatically as being an either an integer, a real or a
+character variable depending on the format of the input variable.
+
+\item As a set of characters enclosed between quotation marks ({\tt '}). In
+this case, the input variable is always considered to be a character variable. 
+
+\end{itemize}
+
+
+The only separator allowed between two input variables is a single or a set of
+blanks (not enclosed between quotation marks). A single input variable cannot
+span two records. Comments can be included in the input deck in one of the
+following ways:
+
+
+\begin{itemize}
+
+\item  characters in column 121 and $\le$ 132 on each record are considered to be
+comments;
+
+\item  all the information following the `{\tt ;}' keyword on a record are not
+considered by the generalized driver;
+
+\item  each record starting with the characters `{\tt *}' is considered to be
+commented out;
+
+\item  all the characters on a given record inserted between `{\tt (*}' and `{\tt
+'*)}' are considered to be commented out.
+
+\end{itemize}
+
+
+This users guide was written using the following conventions:
+
+\begin{itemize}
+
+\item An input structure represents a set of input variables. It is identified
+by a name in boldface surrounded by parenthesis. For example, the complete
+DRAGON input deck is represented by the structure \dstr{DRAGON};
+
+\item A standard DRAGON data structure represents a set records and directory
+stored in a hierarchical format on a direct access
+XSM file or in memory via a linked list.\cite{DragonDataStructures} It is
+identified by a name in small capital letter.
+For example, the data structure \dds{asmpij} contains the multigroup collision
+probability matrices generated by the \moc{ASM:} module of DRAGON;
+
+\item The variables presented using the typewriter font are character
+variables used as keywords. For example \moc{GEO:} is the keyword required to
+activate the geometry reading module of DRAGON.
+
+\item The variables in italics are user defined variables. When indexed and
+surrounded by parenthesis they denote arrays. If they are in lower case they
+represent either integer type  (starting with {\it i} to {\it n}) or real type
+(starting with  {\it a} to {\it h} or {\it o} to {\it z}) variables. If they are
+in upper case they represent character type variables. For example, {\it iprint}
+must be replaced in the input deck by an integer variable,  ({\it
+energy}(igroup), igroup=1,{\it ngroup}+1) states that a vector containing {\it
+ngroup}+1 real elements is to be read while {\it FILE} must be replaced by a
+character variable, its maximum size being generally specified. 
+No character variable can exceed 72 characters in length.
+
+\item The variables or structures surrounded by single square brackets `$[\;]$'
+are optional.
+
+\item The variables or structures surrounded by double square brackets
+`$[[\;]]$' are also optional. However, they can be repeated as many times
+as required.
+
+\item The variables or structures surrounded by braces and separated by vertical
+bars `$\{\; |\; |\; \}$' represents various calculation options available
+in DRAGON. Only one of these options is permitted.
+
+\end{itemize}
+
+When a fixed default value is specified for an optional parameter in a
+structure, it can be modified only locally and is reset to the original default
+value each time the module is called. When a floating default value is specified
+for a variable, it is saved and can be used in later calls to this module. In
+DRAGON, almost every default value is a floating value, with the exception of
+the parameter \dusa{iprint}, which is set to 1 and is used to control the amount
+of information printed in the module.  Departure from this general rule will be
+indicated in the following sections.
-- 
cgit v1.2.3

